\hypertarget{structDecodedSignalValue}{}\doxysection{Decoded\+Signal\+Value Struct Reference}
\label{structDecodedSignalValue}\index{DecodedSignalValue@{DecodedSignalValue}}


One decoded signal value.  




{\ttfamily \#include $<$dbc\+\_\+decoder.\+h$>$}

\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{structDecodedSignalValue_a1481b122a7ce5a618012b1133c6adedf}{Decoded\+Signal\+Value}} ()
\end{DoxyCompactItemize}
\doxysubsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
const \mbox{\hyperlink{structDecodeSignal}{Decode\+Signal}} $\ast$ \mbox{\hyperlink{structDecodedSignalValue_acadc3b3bb21dd6b0412d342c7e6b20d7}{definition}}
\item 
std\+::int64\+\_\+t \mbox{\hyperlink{structDecodedSignalValue_a5138b825940e34689f7b3891627ee9ec}{raw\+Value}}
\item 
double \mbox{\hyperlink{structDecodedSignalValue_a6847d05b3cb00d5e0f6c611968f57978}{physical\+Value}}
\item 
bool \mbox{\hyperlink{structDecodedSignalValue_aac0ed361af545cde48d0e6f41a859686}{valid}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
One decoded signal value. 

Definition at line \mbox{\hyperlink{dbc__decoder_8h_source_l00038}{38}} of file \mbox{\hyperlink{dbc__decoder_8h_source}{dbc\+\_\+decoder.\+h}}.



\doxysubsection{Constructor \& Destructor Documentation}
\mbox{\Hypertarget{structDecodedSignalValue_a1481b122a7ce5a618012b1133c6adedf}\label{structDecodedSignalValue_a1481b122a7ce5a618012b1133c6adedf}} 
\index{DecodedSignalValue@{DecodedSignalValue}!DecodedSignalValue@{DecodedSignalValue}}
\index{DecodedSignalValue@{DecodedSignalValue}!DecodedSignalValue@{DecodedSignalValue}}
\doxysubsubsection{\texorpdfstring{DecodedSignalValue()}{DecodedSignalValue()}}
{\footnotesize\ttfamily Decoded\+Signal\+Value\+::\+Decoded\+Signal\+Value (\begin{DoxyParamCaption}{ }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [inline]}}



Definition at line \mbox{\hyperlink{dbc__decoder_8h_source_l00044}{44}} of file \mbox{\hyperlink{dbc__decoder_8h_source}{dbc\+\_\+decoder.\+h}}.



\doxysubsection{Member Data Documentation}
\mbox{\Hypertarget{structDecodedSignalValue_acadc3b3bb21dd6b0412d342c7e6b20d7}\label{structDecodedSignalValue_acadc3b3bb21dd6b0412d342c7e6b20d7}} 
\index{DecodedSignalValue@{DecodedSignalValue}!definition@{definition}}
\index{definition@{definition}!DecodedSignalValue@{DecodedSignalValue}}
\doxysubsubsection{\texorpdfstring{definition}{definition}}
{\footnotesize\ttfamily const \mbox{\hyperlink{structDecodeSignal}{Decode\+Signal}}$\ast$ Decoded\+Signal\+Value\+::definition}

Signal definition. 

Definition at line \mbox{\hyperlink{dbc__decoder_8h_source_l00039}{39}} of file \mbox{\hyperlink{dbc__decoder_8h_source}{dbc\+\_\+decoder.\+h}}.



Referenced by \mbox{\hyperlink{dbc__decoder_8cpp_source_l00031}{Dbc\+Decoder\+::\+Decode()}}, and \mbox{\hyperlink{main_8cpp_source_l00075}{Print\+Decoded\+Frame()}}.

\mbox{\Hypertarget{structDecodedSignalValue_a6847d05b3cb00d5e0f6c611968f57978}\label{structDecodedSignalValue_a6847d05b3cb00d5e0f6c611968f57978}} 
\index{DecodedSignalValue@{DecodedSignalValue}!physicalValue@{physicalValue}}
\index{physicalValue@{physicalValue}!DecodedSignalValue@{DecodedSignalValue}}
\doxysubsubsection{\texorpdfstring{physicalValue}{physicalValue}}
{\footnotesize\ttfamily double Decoded\+Signal\+Value\+::physical\+Value}

Converted physical value. 

Definition at line \mbox{\hyperlink{dbc__decoder_8h_source_l00041}{41}} of file \mbox{\hyperlink{dbc__decoder_8h_source}{dbc\+\_\+decoder.\+h}}.



Referenced by \mbox{\hyperlink{dbc__decoder_8cpp_source_l00031}{Dbc\+Decoder\+::\+Decode()}}, and \mbox{\hyperlink{main_8cpp_source_l00075}{Print\+Decoded\+Frame()}}.

\mbox{\Hypertarget{structDecodedSignalValue_a5138b825940e34689f7b3891627ee9ec}\label{structDecodedSignalValue_a5138b825940e34689f7b3891627ee9ec}} 
\index{DecodedSignalValue@{DecodedSignalValue}!rawValue@{rawValue}}
\index{rawValue@{rawValue}!DecodedSignalValue@{DecodedSignalValue}}
\doxysubsubsection{\texorpdfstring{rawValue}{rawValue}}
{\footnotesize\ttfamily std\+::int64\+\_\+t Decoded\+Signal\+Value\+::raw\+Value}

Extracted raw integer value. 

Definition at line \mbox{\hyperlink{dbc__decoder_8h_source_l00040}{40}} of file \mbox{\hyperlink{dbc__decoder_8h_source}{dbc\+\_\+decoder.\+h}}.



Referenced by \mbox{\hyperlink{dbc__decoder_8cpp_source_l00031}{Dbc\+Decoder\+::\+Decode()}}, and \mbox{\hyperlink{main_8cpp_source_l00075}{Print\+Decoded\+Frame()}}.

\mbox{\Hypertarget{structDecodedSignalValue_aac0ed361af545cde48d0e6f41a859686}\label{structDecodedSignalValue_aac0ed361af545cde48d0e6f41a859686}} 
\index{DecodedSignalValue@{DecodedSignalValue}!valid@{valid}}
\index{valid@{valid}!DecodedSignalValue@{DecodedSignalValue}}
\doxysubsubsection{\texorpdfstring{valid}{valid}}
{\footnotesize\ttfamily bool Decoded\+Signal\+Value\+::valid}

true if decoding succeeded. 

Definition at line \mbox{\hyperlink{dbc__decoder_8h_source_l00042}{42}} of file \mbox{\hyperlink{dbc__decoder_8h_source}{dbc\+\_\+decoder.\+h}}.



Referenced by \mbox{\hyperlink{dbc__decoder_8cpp_source_l00031}{Dbc\+Decoder\+::\+Decode()}}, and \mbox{\hyperlink{main_8cpp_source_l00075}{Print\+Decoded\+Frame()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{dbc__decoder_8h}{dbc\+\_\+decoder.\+h}}\end{DoxyCompactItemize}
